UPDATE "flow_task_template_parameter" SET "value" = '2' WHERE "id" = 'ChargeNodeStartChargingParameter';
UPDATE "flow_task_template_parameter" SET "value" = '1' WHERE "id" = 'ChargeNodeStopChargingParameter';