INSERT INTO
  "public"."frame_config" (
    "id",
    "key",
    "value",
    "sort_number",
    "is_enable",
    "is_delete",
    "create_at",
    "create_by",
    "update_at",
    "update_by",
    "remark",
    "extend"
  )
VALUES
  (
    gen_random_uuid (),
    'DiaryWindowSeconds',
    '60',
    '0',
    't',
    'f',
    '2026-03-12 12:00:00.00000',
    'FASS.Mvc',
    '2026-03-12 12:00:00.00000',
    'FASS.Mvc',
    NULL,
    NULL
  );

INSERT INTO
  "public"."frame_config" (
    "id",
    "key",
    "value",
    "sort_number",
    "is_enable",
    "is_delete",
    "create_at",
    "create_by",
    "update_at",
    "update_by",
    "remark",
    "extend"
  )
VALUES
  (
    gen_random_uuid (),
    'AlarmWindowSeconds',
    '60',
    '0',
    't',
    'f',
    '2026-03-12 12:00:00.00000',
    'FASS.Mvc',
    '2026-03-12 12:00:00.00000',
    'FASS.Mvc',
    NULL,
    NULL
  );

INSERT INTO
  "public"."frame_config" (
    "id",
    "key",
    "value",
    "sort_number",
    "is_enable",
    "is_delete",
    "create_at",
    "create_by",
    "update_at",
    "update_by",
    "remark",
    "extend"
  )
VALUES
  (
    gen_random_uuid (),
    'TrafficWindowSeconds',
    '30',
    '0',
    't',
    'f',
    '2026-03-12 12:00:00.00000',
    'FASS.Mvc',
    '2026-03-12 12:00:00.00000',
    'FASS.Mvc',
    NULL,
    NULL
  );